From b5c4e8a4528e2c819176cbe070f6fd8e3e34facd Mon Sep 17 00:00:00 2001
From: Christopher Baines <mail@cbaines.net>
Date: Sat, 27 Jun 2020 21:33:24 +0100
Subject: Support storing when builds start

This isn't particularly accurate, what's actually being stored is the current
time when the record is inserted in to the coordinator database, but that
should happen just before the agent starts the build, so hopefully that's good
enough.
---
 sqitch/pg/verify/build_starts.sql | 7 +++++++
 1 file changed, 7 insertions(+)
 create mode 100644 sqitch/pg/verify/build_starts.sql

(limited to 'sqitch/pg/verify/build_starts.sql')

diff --git a/sqitch/pg/verify/build_starts.sql b/sqitch/pg/verify/build_starts.sql
new file mode 100644
index 0000000..248f602
--- /dev/null
+++ b/sqitch/pg/verify/build_starts.sql
@@ -0,0 +1,7 @@
+-- Verify guix-build-coordinator:build_starts on pg
+
+BEGIN;
+
+-- XXX Add verifications here.
+
+ROLLBACK;
-- 
cgit v1.2.3

